import "./ExcalidrawLogo.scss";

const LogoIcon = () => (
  <svg
    viewBox="0 0 40 40"
    fill="none"
    xmlns="http://www.w3.org/2000/svg"
    className="ExcalidrawLogo-icon"
  >
    <path
      d="M39.9 32.889a.326.326 0 0 0-.279-.056c-2.094-3.083-4.774-6-7.343-8.833l-.419-.472a.212.212 0 0 0-.056-.139.586.586 0 0 0-.167-.111l-.084-.083-.056-.056c-.084-.167-.28-.278-.475-.167-.782.39-1.507.973-2.206 1.528-.92.722-1.842 1.445-2.708 2.25a8.405 8.405 0 0 0-.977 1.028c-.14.194-.028.361.14.444-.615.611-1.23 1.223-1.843 1.861a.315.315 0 0 0-.084.223c0 .083.056.166.111.194l1.09.833v.028c1.535 1.528 4.244 3.611 7.12 5.861.418.334.865.667 1.284 1 .195.223.39.473.558.695.084.11.28.139.391.055.056.056.14.111.196.167a.398.398 0 0 0 .167.056.255.255 0 0 0 .224-.111.394.394 0 0 0 .055-.167c.029 0 .028.028.056.028a.318.318 0 0 0 .224-.084l5.082-5.528a.309.309 0 0 0 0-.444Zm-14.63-1.917a.485.485 0 0 0 .111.14c.586.5 1.2 1 1.843 1.555l-2.569-1.945-.251-.166c-.056-.028-.112-.084-.168-.111l-.195-.167.056-.056.055-.055.112-.111c.866-.861 2.346-2.306 3.1-3.028-.81.805-2.43 3.167-2.095 3.944Zm8.767 6.89-2.122-1.612a44.713 44.713 0 0 0-2.625-2.5c1.145.861 2.122 1.611 2.262 1.75 1.117.972 1.06.806 1.815 1.445l.921.666a1.06 1.06 0 0 1-.251.25Zm.558.416-.056-.028c.084-.055.168-.111.252-.194l-.196.222ZM1.089 5.75c.055.361.14.722.195 1.056.335 1.833.67 3.5 1.284 4.75l.252.944c.084.361.223.806.363.917 1.424 1.25 3.602 3.11 5.947 4.889a.295.295 0 0 0 .363 0s0 .027.028.027a.254.254 0 0 0 .196.084.318.318 0 0 0 .223-.084c2.988-3.305 5.221-6.027 6.813-8.305.112-.111.14-.278.14-.417.111-.111.195-.25.307-.333.111-.111.111-.306 0-.39l-.028-.027c0-.055-.028-.139-.084-.167-.698-.666-1.2-1.138-1.731-1.638-.922-.862-1.871-1.75-3.881-3.75l-.028-.028c-.028-.028-.056-.056-.112-.056-.558-.194-1.703-.389-3.127-.639C6.087 2.223 3.21 1.723.614.944c0 0-.168 0-.196.028l-.083.084c-.028.027-.056.055-.224.11h.056-.056c.028.167.028.278.084.473 0 .055.112.5.112.555l.782 3.556Zm15.496 3.278-.335-.334c.084.112.196.195.335.334Zm-3.546 4.666-.056.056c0-.028.028-.056.056-.056Zm-2.038-10c.168.167.866.834 1.033.973-.726-.334-2.54-1.167-3.379-1.445.838.167 1.983.334 2.346.472ZM1.424 2.306c.419.722.754 3.222 1.089 5.666-.196-.778-.335-1.555-.503-2.278-.251-1.277-.503-2.416-.838-3.416.056 0 .14 0 .252.028Zm-.168-.584c-.112 0-.223-.028-.307-.028 0-.027 0-.055-.028-.055.14 0 .223.028.335.083Zm-1.089.222c0-.027 0-.027 0 0ZM39.453 1.333c.028-.11-.558-.61-.363-.639.42-.027.42-.666 0-.666-.558.028-1.144.166-1.675.25-.977.194-1.982.389-2.96.61-2.205.473-4.383.973-6.561 1.557-.67.194-1.424.333-2.066.666-.224.111-.196.333-.084.472-.056.028-.084.028-.14.056-.195.028-.363.056-.558.083-.168.028-.252.167-.224.334 0 .027.028.083.028.11-1.173 1.556-2.485 3.195-3.909 4.945-1.396 1.611-2.876 3.306-4.356 5.056-4.719 5.5-10.052 11.75-15.943 17.25a.268.268 0 0 0 0 .389c.028.027.056.055.084.055-.084.084-.168.14-.252.222-.056.056-.084.111-.084.167a.605.605 0 0 0-.111.139c-.112.111-.112.305.028.389.111.11.307.11.39-.028.029-.028.029-.056.056-.056a.44.44 0 0 1 .615 0c.335.362.67.723.977 1.028l-.698-.583c-.112-.111-.307-.083-.39.028-.113.11-.085.305.027.389l7.427 6.194c.056.056.112.056.196.056s.14-.028.195-.084l.168-.166c.028.027.083.027.111.027.084 0 .14-.027.196-.083 10.052-10.055 18.15-17.639 27.42-24.417.083-.055.111-.166.111-.25.112 0 .196-.083.251-.194 1.704-5.194 2.039-9.806 2.15-12.083v-.028c0-.028.028-.056.028-.083.028-.056.028-.084.028-.084a1.626 1.626 0 0 0-.111-1.028ZM21.472 9.5c.446-.5.893-1.028 1.34-1.5-2.876 3.778-7.65 9.583-14.408 16.5 4.607-5.083 9.242-10.333 13.068-15ZM5.193 35.778h.084-.084Zm3.462 3.194c-.027-.028-.027-.028 0-.028v.028Zm4.16-3.583c.224-.25.448-.472.699-.722 0 0 0 .027.028.027-.252.223-.475.445-.726.695Zm1.146-1.111c.14-.14.279-.334.446-.5l.028-.028c1.648-1.694 3.351-3.389 5.082-5.111l.028-.028c.419-.333.921-.694 1.368-1.028a379.003 379.003 0 0 0-6.952 6.695ZM24.794 6.472c-.921 1.195-1.954 2.778-2.82 4.028-2.736 3.944-11.532 13.583-11.727 13.75a1976.983 1976.983 0 0 1-8.042 7.639l-.167.167c-.14-.167-.14-.417.028-.556C14.49 19.861 22.03 10.167 25.074 5.917c-.084.194-.14.36-.28.555Zm4.83 5.695c-1.116-.64-1.646-1.64-1.34-2.611l.084-.334c.028-.083.084-.194.14-.277.307-.5.754-.917 1.257-1.167.027 0 .055 0 .083-.028-.028-.056-.028-.139-.028-.222.028-.167.14-.278.335-.278.335 0 1.369.306 1.76.639.111.083.223.194.335.305.14.167.363.445.474.667.056.028.112.306.196.445.056.222.111.472.084.694-.028.028 0 .194-.028.194a2.668 2.668 0 0 1-.363 1.028c-.028.028-.028.056-.056.084l-.028.027c-.14.223-.335.417-.53.556-.643.444-1.369.583-2.095.389 0 0-.195-.084-.28-.111Zm8.154-.834a39.098 39.098 0 0 1-.893 3.167c0 .028-.028.083 0 .111-.056 0-.084.028-.14.056-2.206 1.61-4.356 3.305-6.506 5.028 1.843-1.64 3.686-3.306 5.613-4.945.558-.5.949-1.139 1.06-1.861l.28-1.667v-.055c.14-.334.67-.195.586.166Z"
      fill="currentColor"
    />
  </svg>
);

const LogoText = () => (
  <svg
    viewBox="0 0 450 55"
    xmlns="http://www.w3.org/2000/svg"
    fill="none"
    className="ExcalidrawLogo-text"
  >
    <path
      d="M429.27 96.74c2.47-1.39 4.78-3.02 6.83-4.95 1.43-1.35 2.73-2.86 3.81-4.51-.66.9-1.4 1.77-2.23 2.59-2.91 2.84-5.72 5.09-8.42 6.87h.01ZM343.6 69.36c.33 3.13.58 6.27.79 9.4.09 1.37.18 2.75.25 4.12-.12-4.46-.27-8.93-.5-13.39-.11-2.08-.24-4.16-.4-6.24-.06 1.79-.11 3.85-.13 6.11h-.01ZM378.47 98.34c.01-.37.07-1.13.01-6.51-.11 1.9-.22 3.81-.31 5.71-.07 1.42-.22 2.91-.16 4.35.39.03.78.07 1.17.1-.92-.85-.76-2.01-.72-3.66l.01.01ZM344.09 86.12c-.09-2.41-.22-4.83-.39-7.24v12.21c.15-.05.32-.09.47-.14.05-1.61-.03-3.23-.09-4.83h.01ZM440.69 66.79c-.22-.34-.45-.67-.69-.99-3.71-4.87-9.91-7.14-15.65-8.55-1.05-.26-2.12-.49-3.18-.71 2.29.59 4.48 1.26 6.64 2.02 7.19 2.54 10.57 5.41 12.88 8.23ZM305.09 72.46l1.2 3.6c.84 2.53 1.67 5.06 2.46 7.61.24.78.5 1.57.73 2.36.22-.04.44-.08.67-.12a776.9 776.9 0 0 1-5.01-13.57c-.02.04-.03.09-.05.13v-.01ZM345.49 90.25v.31c1.48-.42 3.05-.83 4.66-1.2-1.56.25-3.12.52-4.66.89ZM371.02 90.22c0-.57-.04-1.14-.11-1.71-.06-.02-.12-.04-.19-.05-.21-.05-.43-.08-.65-.11.42.16.74.88.95 1.87ZM398.93 54.23c-.13 0-.27-.01-.4-.02l.03.4c.11-.15.23-.27.37-.38ZM401.57 62.28v-.15c-1.22-.24-2.86-.61-3.23-1.25-.09-.15-.18-.51-.27-.98-.09.37-.2.73-.33 1.09 1.24.56 2.52.98 3.83 1.29ZM421.73 88.68c-2.97 1.65-6.28 3.12-9.69 3.68v.18c4.72-.14 11.63-3.85 16.33-8.38-2.04 1.75-4.33 3.24-6.63 4.53l-.01-.01ZM411.28 80.92c-.05-1.2-.09-2.4-.15-3.6-.21 5.66-.46 11.38-.47 14.51.24-.02.48-.04.71-.07.15-3.61.05-7.23-.09-10.83v-.01Z"
      transform="translate(-144.023 -51.76)"
    />
    <path
      d="M425.38 67.41c-3.5-1.45-7.19-2.57-14.06-3.62.09 1.97.06 4.88-.03 8.12.03.04.06.09.06.15.19 1.36.28 2.73.37 4.1.25 3.77.39 7.55.41 11.33 0 1.38-.01 2.76-.07 4.13 1.4-.25 2.78-.65 4.12-1.15 4.07-1.5 7.94-3.78 11.28-6.54 2.33-1.92 5.13-4.49 5.88-7.58.63-3.53-2.45-6.68-7.97-8.96l.01.02ZM411.35 92.53v-.06l-.34.03c.11.01.22.03.34.03ZM314.26 64.06c-.23-.59-.47-1.17-.7-1.75.57 1.62 1.11 3.25 1.6 4.9l.15.54 2.35 6.05c.32.82.66 1.64.98 2.46-1.38-4.1-2.83-8.17-4.39-12.2h.01ZM156.82 103.07c-.18.13-.38.23-.58.33 1.32-.03 2.66-.2 3.93-.34.86-.09 1.72-.22 2.58-.33-2.12.1-4.12.17-5.94.34h.01ZM210.14 68.88s.03.04.05.07c.18-.31.39-.64.58-.96-.21.3-.42.6-.64.89h.01ZM201.65 82.8c-.5.77-1.02 1.56-1.49 2.37 1.11-1.55 2.21-3.1 3.2-4.59-.23.23-.49.51-.75.79-.32.47-.65.95-.96 1.43ZM194.03 98.66c-.33-.4-.65-.84-1.05-1.17-.24-.2-.07-.49.17-.56-.23-.26-.42-.5-.63-.75 1.51-2.55 3.93-5.87 6.4-9.28-.17-.08-.29-.28-.2-.49.04-.09.09-.17.13-.26-1.21 1.78-2.42 3.55-3.61 5.33-.87 1.31-1.74 2.64-2.54 4-.29.5-.63 1.04-.87 1.61.81.65 1.63 1.27 2.47 1.88-.09-.11-.18-.21-.27-.32v.01ZM307.79 82.93c-1-3.17-2.05-6.32-3.1-9.48-1.62 4.08-3.69 9.17-6.16 15.19 3.32-1.04 6.77-1.87 10.27-2.5-.32-1.08-.67-2.15-1.01-3.21ZM149.5 80.7c.05-1.71.04-3.43 0-5.14-.1 2.26-.16 4.51-.22 6.77-.02.73-.03 1.46-.04 2.19.14-1.27.2-2.55.24-3.82h.02ZM228.98 98.3c.39 1.25.91 3.03.94 3.91.06-.03.12-.07.17-.1.08-1.29-.55-2.65-1.11-3.81ZM307.72 53.36c.81.5 1.53 1.04 2.07 1.49-.38-.8-.78-1.58-1.21-2.35-.17.03-.34.06-.51.11-.43.12-.86.26-1.29.41.35-.01.53.1.94.34ZM283.69 96.14c3.91-7.25 6.89-13.35 8.88-18.15l1.1-2.66c-1.27 2.64-2.56 5.27-3.83 7.9-1.53 3.15-3.06 6.31-4.58 9.47-.87 1.81-1.76 3.62-2.54 5.47.04.02.07.04.11.07.05.05.1.09.15.14.05-.73.27-1.48.71-2.24ZM289.92 103.23s-.04.01-.05.03c0-.02.04-.03.05-.04.05-.05.11-.1.16-.15l.21-.21c-.55 0-1.5-.27-2.55-.72.4.26.8.51 1.22.74.24.13.48.26.73.37.05.02.1.03.14.05a.27.27 0 0 1 .08-.07h.01ZM269.23 68.49c-.39-.19-.82-.48-1.33-.87-3.06-1.56-6.31-2.78-9.36-2.35-3.5.49-5.7 1.11-7.74 2.44 5.71-2.6 12.82-2.07 18.44.79l-.01-.01ZM177.87 53.69l1.06.03c-.96-.22-2-.25-2.89-.3-4.95-.26-9.99.33-14.86 1.19-2.44.43-4.88.95-7.28 1.59 9.09-1.76 15.69-2.77 23.97-2.51ZM219.85 55.51c-.18.12-.36.27-.56.45-.45.53-.86 1.11-1.26 1.66-1.91 2.61-3.71 5.31-5.57 7.95l-.12.18 8.05-10.11c-.18-.05-.36-.1-.55-.13h.01ZM510.71 54.1c.12-.15.29-.3.53-.45.69-.4 3.72-.63 5.87-.74-.36-.02-.73-.04-1.09-.05-1.84-.03-3.67.09-5.49.35.05.3.12.59.18.88v.01ZM510.76 86.02c1.37-3.07 2.49-6.27 3.57-9.46.55-1.64 1.12-3.3 1.6-4.97-1.59 4.01-3.67 9.14-6.2 15.3.24-.08.5-.14.74-.22.1-.22.19-.44.29-.65ZM566.95 75.76c.11-.02.23.03.31.11-.05-.13-.09-.26-.14-.39-.05.09-.11.18-.17.28ZM511.33 86.41c3.08-.89 6.24-1.62 9.46-2.14-1.51-3.98-2.98-7.96-4.39-11.87-.05.15-.09.31-.14.46-1.02 3.32-2.15 6.61-3.39 9.85-.48 1.25-.98 2.49-1.53 3.7h-.01ZM578.24 74.45c.11-.44.23-.87.35-1.31-.31.7-.64 1.39-.97 2.08.09.21.19.4.28.61.12-.46.23-.92.35-1.38h-.01ZM520.62 53.11c-.09 0-.18-.01-.28-.02.38.34.29 1.08.93 2.53l6.65 17.15c2.2 5.68 4.69 11.36 7.41 16.87l1.06 2.17c-2.95-7.05-5.92-14.08-8.87-21.13-1.58-3.79-3.16-7.59-4.7-11.4-.78-1.92-1.73-3.89-2.25-5.91-.03-.1 0-.19.04-.26h.01ZM578.78 77.87c1.45-5.77 3.07-10.43 3.58-13.36.05-.34.16-.88.31-1.55-.67 1.79-1.37 3.56-2.08 5.33-.12.43-.23.86-.35 1.29-.65 2.43-1.29 4.86-1.9 7.3.14.33.29.65.43 1l.01-.01ZM545.3 94.66c.02-.44.03-.83.05-1.12.02-1.01.05-2.02.11-3.02.03-6.66-.46-14.33-1.46-22.8-.13-.42-.27-1.24-.56-2.89 0-.02 0-.04-.01-.06.62 6.61.95 13.25 1.32 19.87.17 3.08.33 6.16.52 9.23.02.25.03.52.04.78l-.01.01ZM580.77 102.81c.13.2.27.38.37.49.27-.11.53-.22.8-.32-.43.09-.82.05-1.17-.16v-.01ZM530.48 104.07h.33c-.36-.13-.71-.32-1.04-.56.14.24.3.47.45.7.06-.08.14-.13.26-.13v-.01ZM542.63 58.82c.06.23.11.47.15.71.14-.33.36-.62.7-.86-.28.05-.57.11-.85.15ZM583.81 57.87c.15-.7.29-1.41.42-2.11-.14.45-.28.9-.42 1.34-.46 1.44-.89 2.89-1.31 4.34.44-1.19.88-2.37 1.31-3.57ZM523.62 91.48c-4.66 1.17-9.05 2.89-14.02 5.27 4.65-1.84 9.48-3.29 14.28-4.63-.09-.22-.17-.41-.26-.64ZM460.64 78.3c-.04-2.9-.11-5.81-.28-8.71-.1-1.68-.17-3.43-.5-5.09-.07.02-.14.03-.2.05.3 6.54.45 12.17.51 17.12.17-.07.34-.14.51-.2 0-1.06-.01-2.11-.03-3.17h-.01ZM470.63 63.24c-3.38-.26-6.81.32-10.1 1.1.41 2.01.47 4.14.57 6.18.18 3.55.25 7.11.27 10.67 3.31-1.38 6.5-3.12 9.3-5.35 1.96-1.56 3.86-3.41 5.02-5.66.73-1.41 1.19-3.22.26-4.65-1.09-1.7-3.46-2.14-5.32-2.29ZM460.29 63.68c1-.24 2.01-.46 3.04-.65-1.15.16-2.37.38-3.71.69v.13c.07-.02.15-.04.22-.05.11-.13.3-.18.45-.11v-.01ZM457.24 100.96c.43-.03.86-.07 1.29-.11.14-.49.27-.99.38-1.49-.44.7-1 1.23-1.67 1.6ZM482.88 104.98c-.18.23-.36.38-.55.47.14.09.27.19.4.28a70.76 70.76 0 0 0 4.37-4.63c.76-.89 1.52-1.81 2.19-2.77-.3-.27-.61-.53-.92-.79-.07 1.94-4.62 6.32-5.49 7.45v-.01Z"
      transform="translate(-144.023 -51.76)"
    />
    <path
      d="M474.36 63.31c-.4-.16-.84-.27-1.29-.37 1.56.42 3.08 1.22 3.76 2.74.62 1.4.32 2.95-.28 4.32.7-1.22.94-2.34.74-3.47-.24-1.33-1.19-2.54-2.93-3.21v-.01ZM477.34 89.18c-1.2-.81-2.4-1.62-3.6-2.42-.14.1-.26.19-.4.29 1.4.67 2.73 1.39 4 2.13ZM465.88 93.85c.37.25.74.5 1.1.75.46.32.92.65 1.38.97-1.57-1.2-2.01-1.61-2.49-1.72h.01ZM574.92 90.06c-2.28-5.21-4.93-11.13-5.67-12.26-.1-.15-1.57-3.01-1.63-3.08 0 0-.01.02-.02.02.4 1.37 1.09 2.69 1.65 3.99 2.14 4.95 4.36 9.86 6.67 14.73.6 1.26 1.21 2.52 1.83 3.78-.75-2.01-1.64-4.45-2.83-7.18ZM448.73 65.29c.1.2.22.38.34.57.22-.02.43-.06.65-.08v-.08c-.14-.05-.25 0-.99-.41ZM460.16 94.81c-.02.31-.06.59-.1.89-.03 1.71-.33 3.43-.79 5.07.15-.02.3-.03.45-.05.01-.04.02-.08.03-.11.09-.34.15-.69.2-1.03.17-1.07.25-2.16.33-3.24.05-.69.08-1.39.12-2.08-.27.1-.27.26-.24.57v-.02Z"
      transform="translate(-144.023 -51.76)"
    />
    <path
      d="m328.67 98.12-3.22-6.58c-1.29-2.63-2.53-5.29-3.72-7.97-.25-.85-.52-1.69-.79-2.53-.81-2.57-1.67-5.12-2.55-7.67-1.92-5.53-3.9-11.08-6.32-16.41-.72-1.58-1.46-3.44-2.63-4.79-.03-.17-.16-.29-.34-.36a.282.282 0 0 0-.23-.04c-.06-.01-.12 0-.18.01-.74.06-1.5.38-2.19.61-2.22.77-4.4 1.64-6.63 2.38-.03-.08-.06-.16-.09-.25-.15-.42-.82-.24-.67.19.03.09.07.19.1.28l-.18.06c-.36.11-.28.6 0 .68.18 1.18.63 2.36.98 3.49.03.09.06.17.08.26-.08.23-.17.46-.24.64-.37.98-.79 1.94-1.21 2.9-1.27 2.89-2.62 5.75-3.98 8.6-3.18 6.67-6.44 13.31-9.64 19.97-1.08 2.25-2.2 4.5-3.15 6.81-.13.32.24.5.5.37 1.34 1.33 2.84 2.5 4.4 3.57.65.44 1.31.87 2.01 1.24.4.22.86.48 1.33.5.24.01.35-.19.33-.37.11-.1.21-.21.28-.28.41-.41.81-.84 1.2-1.26.85-.92 1.69-1.87 2.5-2.84 6.31-2.34 12.6-4.31 18.71-5.84 2.14 5.3 3.43 8.43 3.97 9.58.55 1.05 1.15 1.88 1.82 2.52 1.32.56 6.96-.03 9.23-1.96.87-1.28 1.19-2.67.93-4.15-.09-.5-.22-.95-.4-1.33l-.01-.03Zm-20.09-45.61c.43.77.83 1.56 1.21 2.35-.54-.45-1.27-.99-2.07-1.49-.42-.24-.6-.35-.94-.34.43-.15.85-.29 1.29-.41.17-.05.34-.08.51-.11Zm-25.86 45.66c.78-1.85 1.67-3.66 2.54-5.47 1.51-3.16 3.05-6.31 4.58-9.47 1.28-2.63 2.56-5.26 3.83-7.9l-1.1 2.66c-1.99 4.79-4.97 10.9-8.88 18.15-.43.76-.66 1.51-.71 2.24-.05-.05-.1-.09-.15-.14a.259.259 0 0 0-.11-.07Zm6.24 4.71c-.42-.23-.82-.48-1.22-.74 1.05.45 2 .72 2.55.72l-.21.21c-.05.05-.11.1-.16.15-.01.01-.04.03-.05.04 0-.02.03-.02.05-.03a.27.27 0 0 0-.08.07c-.05-.02-.1-.03-.14-.05-.25-.1-.49-.24-.73-.37h-.01Zm15.73-29.43c1.05 3.15 2.1 6.31 3.1 9.48.34 1.06.69 2.13 1.01 3.21-3.5.63-6.95 1.46-10.27 2.5 2.48-6.03 4.54-11.11 6.16-15.19Zm4.79 12.57c-.23-.79-.49-1.58-.73-2.36-.79-2.54-1.63-5.08-2.46-7.61l-1.2-3.6c.02-.04.04-.09.05-.13 1.6 4.45 3.28 9 5.01 13.57l-.67.12v.01Zm5.83-18.27-.15-.54c-.49-1.64-1.03-3.28-1.6-4.9.23.58.47 1.17.7 1.75 1.56 4.03 3.01 8.1 4.39 12.2-.33-.82-.67-1.64-.98-2.46l-2.35-6.05h-.01ZM390.43 79.37c-.13-10.43-.22-17.5-.24-19.97-.24-1.6.21-2.88-.65-3.65-.14-.13-.32-.23-.52-.32h.03c.45 0 .45-.69 0-.7-1.75-.03-3.5-.04-5.25-.14-1.38-.08-2.76-.21-4.15-.31-.07 0-.12.01-.17.04-.21-.07-.47.03-.45.31l.03.45c-.11.14-.19.3-.22.5-.21 1.26-.32 13.67-.36 23.59-.32 5.79-.67 11.57-.97 17.36-.09 1.73-.29 3.54-.21 5.3-.39.02-.38.64.04.69v.12c.05.44.74.45.7 0v-.06c1.1.09 2.2.21 3.3.3 1.14.19 2.44.2 3.29.17 1.73-.05 2.92-.05 3.8-.37.45-.05.9-.11 1.35-.17.44-.06.25-.73-.19-.67h-.01c.24-.32.45-.72.62-1.25.66-1.84.41-6.36.34-11.33l-.13-9.9.02.01Zm-12.26 18.17c.09-1.91.2-3.81.31-5.71.06 5.38 0 6.14-.01 6.51-.05 1.65-.21 2.81.72 3.66-.39-.04-.78-.07-1.17-.1-.06-1.44.09-2.93.16-4.35l-.01-.01ZM588.97 53.85c-2.06-.25-3.17-.51-3.76-.6a.3.3 0 0 1 .04-.08c.22-.39-.39-.75-.6-.35-.56 1.02-.9 2.19-1.26 3.29-.61 1.88-1.17 3.78-1.72 5.68-.63 2.19-1.24 4.39-1.83 6.59-.81 2.03-1.67 4.05-2.61 6.03-1.7-3.64-3.11-6.04-4.03-7.57-2.26-3.74-2.85-5.48-3.57-6.08l.31-.09c.43-.12.25-.8-.19-.67-1.06.3-2.12.6-3.17.95-.93.32-1.85.69-2.76 1.07-.13.05-.19.16-.22.27-.04.02-.08.05-.11.07-.04-.06-.07-.12-.11-.18a.354.354 0 0 0-.48-.12c-.16.09-.22.32-.13.48l.33.54c0 .09.02.18.06.28.51 1.16.78 1.38.72 1.47-2.42 3.44-5.41 7.86-6.2 9.1-1.27 1.97-2.01 3.14-2.45 3.84l-.91-6.56-.43-4.1c-.19-1.85-.37-3.23-.53-4.13-.19-1.1-.3-2.15-.45-3.16-.2-1.36-.29-2.06-.47-2.42h.04c.45.02.45-.68 0-.7-3.43-.16-6.81.94-10.17 1.48-.24-.22-.73-.04-.58.32.24.59.33 1.25.43 1.87.17 1.06.29 2.13.4 3.2.32 3.09.53 6.2.74 9.3.44 6.75.77 13.51 1.17 20.26.11 1.95.13 3.96.46 5.89.05.3.37.31.55.14.74 1.71 2.87 1.27 6.13 1.27 1.34 0 2.39.04 2.99-.11.02.32.48.53.63.18 3.61-8.26 7.41-16.46 12.05-24.2.03-.05.04-.1.05-.15.3.73.64 1.45.94 2.16.97 2.26 1.97 4.52 2.98 6.76 2.26 5.03 4.54 10.07 7.09 14.96.47.9.94 1.79 1.47 2.65.2.32.4.67.66.96-.18.25 0 .68.34.54.91-.38 1.82-.75 2.76-1.07 1.04-.35 2.11-.65 3.17-.95.39-.11.28-.66-.07-.68.62-.4.95-.96.87-1.91-.3-3.34.72-7.47.86-8.52l2.14-11.43c1.75-10.74 3.13-17.51 3.23-20.86.02-.49.08-2.84.13-3.24.17-1.25.48-1-4.96-1.65l.03-.02Zm-46.19 5.67c-.04-.24-.09-.48-.15-.71l.85-.15c-.34.24-.56.53-.7.86Zm1.95 25.12c-.36-6.63-.7-13.26-1.32-19.87 0 .02 0 .04.01.06.29 1.65.44 2.47.56 2.89 1 8.46 1.5 16.14 1.46 22.8-.06.99-.1 2-.11 3.02-.01.29-.03.68-.05 1.12-.01-.26-.03-.53-.04-.78-.19-3.08-.35-6.16-.52-9.23l.01-.01Zm36.4 18.66c-.11-.11-.24-.29-.37-.49.35.21.74.26 1.17.16-.27.11-.53.22-.8.32v.01Zm-.89-33.72c.12-.43.23-.86.35-1.29.71-1.77 1.41-3.55 2.08-5.33-.15.68-.26 1.22-.31 1.55-.5 2.94-2.13 7.59-3.58 13.36-.15-.35-.29-.66-.43-1 .61-2.44 1.25-4.87 1.9-7.3l-.01.01Zm3.56-12.48c.14-.44.28-.89.42-1.34-.13.7-.27 1.41-.42 2.11-.43 1.19-.86 2.38-1.31 3.57.42-1.45.85-2.9 1.31-4.34Zm-5.22 16.05c-.11.44-.23.87-.35 1.31-.12.46-.23.92-.35 1.38-.1-.22-.19-.4-.28-.61.34-.69.66-1.38.97-2.08h.01Zm-11.64 2.62c.06-.1.12-.19.17-.28.05.13.09.26.14.39a.398.398 0 0 0-.31-.11Zm2.3 2.98c-.56-1.3-1.25-2.63-1.65-3.99 0 0 .01-.02.02-.02.06.08 1.52 2.93 1.63 3.08.73 1.13 3.38 7.04 5.67 12.26 1.2 2.73 2.08 5.17 2.83 7.18-.62-1.25-1.23-2.51-1.83-3.78-2.31-4.87-4.53-9.78-6.67-14.73ZM275.92 87.03c-1.06-2.18-1.13-3.45-2.44-2.93-1.52.57-2.94 1.3-4.5 2.1-1.4.72-2.68 1.44-3.92 2.12.01-.25-.24-.5-.51-.34-4.8 2.93-12.41 4.7-17.28 1.31-1.98-1.77-3.32-4.15-3.97-5.78-.29-.95-.49-1.94-.63-2.93-.14-3.34 1.58-6.53 3.9-9.12.8-.79 1.68-1.51 2.66-2.12 3.7-2.3 8.22-3.07 12.51-2.51 2.71.35 5.32 1.24 7.71 2.55.39.22.75-.39.35-.6-.18-.1-.37-.18-.55-.27.56.27 1.03.33 1.51.19l-.48.39c-.15.11-.23.3-.13.48.09.15.33.24.48.13 1.3-.97 2.46-2.09 3.45-3.37.37-.29.64-.6.65-.97v-.02c.08-.33-.03-.7-.21-1.08-.31-.87-.98-2.01-2.19-3.26-2.43-2.52-3.79-3.45-5.68-4.26-1.14-.49-3.12-1.06-4.42-1.23-3.28-.42-10.64-1.21-18.18 4.11-7.74 5.46-11.94 12.3-12.23 20.61-.08 2.06.04 3.98.34 5.71.74 4.18 2.57 8 5.44 11.34 4.26 4.99 9.76 7.52 16.34 7.52 4.85 0 9.69-1.77 14.89-4.62.23-.12.45-.23.68-.35 2.19-1.1 4.37-2.23 6.46-3.5.49-.3 1.03-.61 1.5-.98 1.47-.87 1.11-1.12.49-2.95-.39-1.14-.76-2.7-2.06-5.36l.02-.01Zm-17.38-21.76c3.05-.42 6.31.79 9.36 2.35.51.39.94.68 1.33.87-5.61-2.86-12.72-3.39-18.44-.79 2.05-1.33 4.24-1.95 7.74-2.44l.01.01ZM443.67 72.67c-.4-2.2-1.15-4.33-2.37-6.22-1.49-2.32-3.58-4.19-5.91-5.64-6.17-3.81-13.75-5.11-20.83-6.01-3.23-.41-6.47-.69-9.72-.92l-1.39-.12c-.85-.07-1.52-.1-2.05-.1-1.08-.06-2.17-.12-3.25-.17-.08 0-.14.02-.19.05-.1.05-.18.14-.16.3.27 2.55-.01 5.12-.92 7.52-.15.38.4.56.62.28 1.32.59 2.68 1.05 4.08 1.37 0 2.78-.14 7.58-.33 12.91 0 0 0 .02-.01.03-.61 3.66-.79 7.42-1 11.12-.23 4.01-.43 8.03-.44 12.05 0 .64 0 1.28.03 1.93.02.31 0 .68.15.96.06.11.14.16.24.17-.2.17-.21.54.11.59 3.83.67 7.78.71 11.68.25 2.3-.19 4.87-.65 7.65-1.56 1.85-.54 3.67-1.18 5.43-1.91 7.2-3.02 14.31-8.07 17.35-15.53.76-1.86 1.17-3.8 1.31-5.75.3-1.93.28-3.82-.09-5.58l.01-.02Zm-19.32-15.42c5.74 1.41 11.94 3.68 15.65 8.55.25.32.47.65.69.99-2.3-2.82-5.68-5.69-12.88-8.23-2.16-.76-4.35-1.43-6.64-2.02 1.06.21 2.13.45 3.18.71Zm-25.82-3.04c.13 0 .27.01.4.02-.14.1-.26.23-.37.38 0-.13-.02-.26-.03-.4Zm34.82 22.17c-.75 3.09-3.55 5.66-5.88 7.58-3.35 2.76-7.21 5.03-11.28 6.54-1.33.49-2.71.9-4.12 1.15.06-1.38.08-2.76.07-4.13-.02-3.78-.16-7.56-.41-11.33-.09-1.37-.18-2.74-.37-4.1 0-.06-.03-.11-.06-.15.09-3.25.12-6.16.03-8.12 6.86 1.05 10.56 2.17 14.06 3.62 5.52 2.28 8.59 5.44 7.97 8.96l-.01-.02Zm-22 16.15c-.12 0-.23-.02-.34-.03l.34-.03v.06Zm-.69-.7c0-3.13.26-8.84.47-14.51.06 1.2.11 2.41.15 3.6.15 3.6.25 7.23.09 10.83-.24.03-.48.05-.71.07v.01Zm-12.33-30.94c.37.63 2.01 1.01 3.23 1.25v.15c-1.31-.31-2.59-.73-3.83-1.29.12-.36.23-.72.33-1.09.08.48.18.84.27.98Zm13.7 31.65v-.18c3.41-.56 6.71-2.02 9.69-3.68 2.31-1.28 4.59-2.78 6.63-4.53-4.69 4.53-11.61 8.24-16.33 8.38l.01.01Zm24.07-.75c-2.05 1.93-4.37 3.56-6.83 4.95 2.7-1.78 5.52-4.03 8.42-6.87.82-.82 1.56-1.69 2.23-2.59-1.08 1.65-2.38 3.16-3.81 4.51h-.01ZM187.16 92.14c-.79-2.47-2.1-7.12-3.1-6.87-.19-.01-2.09.77-4.08 1.54-3.06 1.18-5.91 2.13-10.09 2.82-2.74.42-5.87 1.01-10.61 1.06.04-3.34.05-6.01.05-7.99 7.97-.65 12.33-2.11 16.37-3.55 1.11-.39 2.69-1.01 2.63-1.8-.08-.35-.55-1.39-1.17-2.61-.47-1.16-.98-2.31-1.61-3.38-.42-.71-1.04-1.69-1.86-2.06-.11-.08-.22-.13-.29-.12-.02 0-.04 0-.07.01-.19-.04-.39-.05-.6-.01-.17.03-.24.15-.25.28-.04.02-.09.04-.14.05-4.33 1.48-8.85 2.33-13.24 3.61a499.1 499.1 0 0 0-.31-8.19c4.51-.99 8.88-1.38 13.11-1.82 3.68-.38 6.28.12 7.47.34.59.11.9.16 1.16.18h.1c-.1.37.44.66.62.28.02-.04.03-.08.05-.13.15.2.53.22.62-.1.17-.58.19-1.21.21-1.81v-.36c.03-.15.05-.3.07-.45.52-2.47.33-5.09-.64-7.44-.11-.27-.44-.28-.6-.14-.08-.21-.15-.42-.24-.62-.19-.41-.79-.05-.6.35.03.07.05.15.09.22-.98-.42-2.15-.54-3.17-.63-2.17-.19-4.37-.14-6.54 0-5.7.35-11.4 1.3-16.91 2.79-2.08.56-4.13 1.22-6.14 2-4.54 1.05-3.79 1.51-2.17 6.07.18.51.46 1.68.54 1.94.82 2.47 1.08 2.13 3.1 2.13s0 .05 0 .08h.52c-.48 2.66-.51 5.45-.62 8.13-.15 3.48-.22 6.96-.28 10.45 0 .41-.01.82-.02 1.23-.16.29-.33.57-.51.85-.05.38-.09.77-.14 1.18-.42 3.52-.59 6.48-.52 8.8v.34c.02.47.05.76.06.87.16 1.57-.26 3.47 1.35 3.79 1.61.32 3.5.55 4.85.55.11 0 .22-.02.33-.02 1.79.24 3.67.05 5.45-.12 2.85-.28 5.69-.7 8.51-1.19 3.03-.53 6.05-1.14 9.04-1.86 2.4-.58 4.82-1.19 7.13-2.06.51-.19 1.73-.57 2.46-1.14 1.81-.68 2.18-1 1.57-2.67-.23-.62-.48-1.49-.91-2.78l-.03-.02Zm-11.12-38.71c.89.05 1.93.08 2.89.3-.33 0-.68-.02-1.06-.03-8.28-.26-14.88.75-23.97 2.51 2.41-.64 4.85-1.16 7.28-1.59 4.87-.86 9.91-1.45 14.86-1.19Zm-26.53 22.13c.03 1.71.04 3.43 0 5.14-.04 1.27-.11 2.55-.24 3.82 0-.73.02-1.46.04-2.19.05-2.26.12-4.51.22-6.77h-.02Zm6.73 27.85c.2-.1.4-.21.58-.33 1.82-.17 3.82-.24 5.94-.34-.86.11-1.72.24-2.58.33-1.27.14-2.61.31-3.93.34h-.01ZM534.48 85.44c-3.52-8.38-7.07-16.75-10.5-25.17-.63-1.54-1.25-3.09-1.86-4.65-.31-.8-.65-1.6-.87-2.43-.04-.17-.17-.24-.31-.25.1-.2 0-.51-.29-.53-1.59-.08-3.18-.22-4.78-.25-1.96-.03-3.91.13-5.84.42-.31.05-.31.38-.13.56-.03.06-.05.14-.04.22.23 1.54.63 3.06 1.16 4.53.13.35.27.7.41 1.06l-2.68 6.18c-.11.03-.2.09-.25.22-.67 1.9-1.52 3.73-2.34 5.56a536.85 536.85 0 0 1-3.9 8.45c-2.64 5.64-5.34 11.25-7.91 16.93-.44.97-.88 1.94-1.29 2.93-.2.48-.47 1-.55 1.52v.05c-.02.12.02.26.16.34 1.19.73 2.41 1.41 3.66 2.05 1.2.62 2.45 1.25 3.76 1.61.43.12.62-.55.19-.67-1.13-.31-2.2-.83-3.24-1.36 1.09.36 2.1.69 2.75.93 2.82 1.01 2.38 1.1 4.3-3.75 2.1-1.09 4.34-1.96 6.53-2.79 4.35-1.64 8.8-3.03 13.27-4.29.82 2.01 1.77 3.97 2.72 5.92.35.83.62 1.45.79 1.82.22.42.45.8.69 1.15.17.33.33.67.5 1 .42.8.84 1.63 1.4 2.35.23.29.6 0 .55-.31 1.53-.02 3.06-.07 4.58-.27.92-.12 1.82-.32 2.71-.54 1.39-.27 3.85-1.11 3.74-1.42-.67-1.96-1.55-3.87-2.34-5.78-1.57-3.78-3.16-7.56-4.75-11.33v-.01Zm-11.65-26.16c1.54 3.81 3.12 7.6 4.7 11.4 2.94 7.05 5.91 14.09 8.87 21.13l-1.06-2.17c-2.71-5.51-5.2-11.19-7.41-16.87l-6.65-17.15c-.65-1.45-.55-2.19-.93-2.53.09 0 .18.01.28.02a.29.29 0 0 0-.04.26c.52 2.02 1.47 3.98 2.25 5.91h-.01Zm-6.58 13.58c.05-.15.09-.31.14-.46 1.41 3.92 2.88 7.9 4.39 11.87-3.22.52-6.38 1.25-9.46 2.14.55-1.22 1.05-2.46 1.53-3.7 1.24-3.24 2.37-6.53 3.39-9.85h.01Zm-.23-20c.36 0 .73.03 1.09.05-2.15.1-5.18.33-5.87.74-.24.15-.41.3-.53.45-.06-.29-.13-.58-.18-.88 1.82-.26 3.65-.39 5.49-.35v-.01Zm-.09 18.72c-.49 1.67-1.05 3.33-1.6 4.97-1.07 3.19-2.19 6.38-3.57 9.46-.09.21-.19.43-.29.65-.25.07-.5.14-.74.22 2.53-6.16 4.61-11.29 6.2-15.3Zm-6.34 25.16c4.97-2.38 9.37-4.1 14.02-5.27l.26.64c-4.8 1.35-9.63 2.8-14.28 4.63Zm20.17 6.76c.33.23.68.42 1.04.56h-.33c-.12 0-.21.06-.26.13-.15-.23-.31-.45-.45-.7v.01ZM226.57 91.75c-3.55-4.74-6.68-9.11-9.31-12.99 9.2-15.25 10.05-17.81 10.35-18.38.17-.34 1.09-2.27.64-2.53-1.13-.65-1.03-.65-2.97-1.71-1.19-.65-3.04-1.61-4.53-2.12-1.71-.59-1.24-.36-3 2.77-.06.1-.11.2-.17.3-.75 1.02-1.48 2.05-2.2 3.09-1.88 2.71-3.73 5.45-5.69 8.1-3.68-4.91-6.88-8.76-9.51-11.43-.15-.15-.3-.29-.46-.42-1.27-1.28-7.24 3.53-7.93 5.58-.09.09-.19.16-.28.25-.27.26.03.64.33.58.19.65.5 1.29.94 1.91 3.85 5.06 7.19 9.76 9.94 14-1.23 2.61-3.06 5-4.67 7.38l-2.28 3.33c-.5.66-.93 1.23-1.29 1.69-.67.93-2.09 2.61-2.3 3.87-.51.85-1.16 1.84-1.29 2.83-.06.44.61.63.67.19.01-.08.04-.15.06-.22 1.36 1.08 2.76 2.11 4.19 3.11 1.3.91 2.62 1.85 4.04 2.56.21.1.4 0 .48-.17.24.07.48.14.72.2.44.1.62-.57.19-.67-2.02-.48-3.77-1.57-5.23-3.02-.47-.46-.9-.96-1.32-1.46 1.74 1.35 4.2 2.89 5.89 4.14 1.39 1.03 2.85-2.27 4.22-4.2 1.86-2.64 3.96-5.86 5.52-8.29l10.39 14.51c.67.81 1.14 1.21 1.57 1.36-.05.24.12.51.41.4 1.53-.58 3.05-1.19 4.54-1.87 1.52-.69 3.06-1.45 4.36-2.5a.28.28 0 0 0 .12-.23c1.66-1.1.81-1.74-1.41-4.91-1.13-1.58-1.71-2.36-3.7-5.01l-.03-.02Zm2.41 6.54c.56 1.15 1.19 2.52 1.11 3.81-.06.04-.12.07-.17.1-.03-.88-.55-2.66-.94-3.91Zm-16.51-32.73c1.86-2.65 3.65-5.35 5.57-7.95.4-.55.81-1.13 1.26-1.66.19-.18.38-.33.56-.45.18.03.36.08.55.13l-8.05 10.11.12-.18h-.01ZM192.7 95.48c.79-1.37 1.66-2.69 2.54-4 1.19-1.79 2.4-3.56 3.61-5.33-.04.09-.09.17-.13.26-.1.22.03.41.2.49-2.47 3.42-4.89 6.73-6.4 9.28.21.24.4.48.63.75-.24.07-.4.36-.17.56.4.33.72.77 1.05 1.17.09.11.18.21.27.32-.84-.61-1.66-1.24-2.47-1.88.24-.57.58-1.11.87-1.61v-.01Zm7.46-10.32c.47-.81.98-1.59 1.49-2.37.31-.48.64-.95.96-1.43.26-.29.52-.56.75-.79-.99 1.48-2.09 3.03-3.2 4.59Zm10.03-16.22s-.03-.05-.05-.07c.22-.29.43-.59.64-.89-.2.32-.4.65-.58.96h-.01ZM371.54 87.96c-.01-.08-.01-.16-.03-.23-.06-.38-.58-.29-.66.03-.3-.05-.6-.08-.81-.11-1.14-.15-2.29-.19-3.44-.2 1.04-.09 2.09-.18 3.14-.23.45-.02.45-.72 0-.7-6.57.35-13.14 1.23-19.65 2.11-1.53.21-3.05.42-4.57.68-.01 0-.02.01-.04.01-.04-3.33-.13-6.66-.24-9.99-.19-5.7-.4-11.41-.88-17.1-.13-1.51-.23-3.07-.49-4.58 0-.25 0-.48-.02-.68-.06-1.19-.04-2.61-.68-2.78-.16-.07-.72-.16-1.5-.24.22-.17.16-.62-.2-.63-1.19-.04-2.39.09-3.57.23-1.2.14-2.41.32-3.59.6-.16-.1-.41-.06-.5.12-.06.02-.13.03-.19.05-.35.1-.29.55-.03.66-.26.6-.19 2.27-.21 3-.02.66-.66 33.73-.9 40.3-.03.65.06 1.12.04 1.45-.16 3.05.87 4.96 6.34 3.93 1.09-.08 2.75-.77 5.36-1.43 4.13-1.04 5.78-1.52 6.2-1.65 6.43-1.69 6.78-1.97 11.72-2.43.55-.05 4.8-.38 6.03-.3.64.04 1.19.07 1.65.1.09 0 .16-.03.24-.05.1.27.56.33.66-.02.39-1.32.61-2.71.78-4.08.2-1.61.29-3.24.15-4.86.24.03.52-.23.38-.53-.09-.2-.27-.33-.49-.43v-.02Zm-.63.56c.07.57.11 1.14.11 1.71-.21-.99-.53-1.71-.95-1.87.22.03.44.06.65.11.06.01.12.04.19.05Zm-25.41 1.73c1.54-.36 3.1-.64 4.66-.89-1.61.37-3.18.77-4.66 1.2v-.31Zm-.86-7.37c-.07-1.37-.16-2.75-.25-4.12-.21-3.13-.45-6.27-.79-9.4.02-2.25.08-4.31.13-6.11.16 2.08.29 4.16.4 6.24.23 4.46.38 8.93.5 13.39h.01Zm-.94-4c.16 2.41.29 4.83.39 7.24.06 1.6.14 3.22.09 4.83-.15.05-.32.09-.47.14V78.88h-.01ZM483.72 92.83c-3.05-2.28-6.22-4.4-9.38-6.51 8.86-6.49 13.49-12.95 13.73-19.23.04-.76 0-1.5-.13-2.2-.67-3.82-3.5-6.68-8.39-8.48.13.04.27.08.4.13 3.92 1.39 7.74 4.23 8.5 8.56.34 1.95-.05 3.96-.98 5.69-.21.4.39.75.6.35 1.86-3.46 1.46-7.55-.97-10.63-3.53-4.47-9.76-5.88-15.16-6.16-2.32-.12-4.64-.04-6.95.19-6 .32-12.71 1.68-17.63 3.21-.37.11-.67.23-.92.35-.2-.17-.62.02-.57.37v.03c-.64.68-.18 1.64.48 3.21.38.91.67 1.89 1.15 2.58.32.76.68 1.51 1.13 2.19.14.21.38.19.53.07.19-.02.38-.05.57-.08v1.57c-.06.06-.1.13-.11.23-.27 4.18-.34 8.38-.48 12.57l-.3 9.03c-.24 3.91-.44 6.77-.46 7.26-.05.88-.11 1.95.07 2.81-.01.22-.02.43-.04.65 0 .11-.02.23-.03.35 0 .05-.03.27-.01.16-.05.4.5.59.64.28.05.04.12.08.2.08 1.75.13 3.5.28 5.25.3 1.69.02 3.38-.12 5.06-.32.08.23.36.39.55.15.06-.08.11-.17.16-.26.18-.09.24-.32.18-.48.05-.2.1-.4.13-.6.16-.86.25-1.74.33-2.62.11-1.17.17-2.34.23-3.51.15-.01.32-.03.52-.04.36-.03 1.73-.15 2.06-.15.39 0 .7-.02.95-.04 1.76 1.11 3.45 2.35 5.14 3.55 2.83 2.01 5.64 4.04 8.47 6.04 1.42 1 2.85 2 4.29 2.97.1.06.19.07.27.04.08 0 .17-.02.25-.1 1.61-1.56 3.15-3.18 4.6-4.88.75-.88 1.49-1.78 2.15-2.73.01.01.03.02.04.03.34.3.83-.2.49-.49-2.16-1.9-4.34-3.76-6.64-5.48l.03-.01Zm-6.38-3.65a55.72 55.72 0 0 0-4-2.13c.14-.1.26-.19.4-.29 1.2.81 2.4 1.61 3.6 2.42Zm-20.1 11.78c.67-.37 1.23-.91 1.67-1.6-.11.5-.24 1-.38 1.49-.43.04-.86.08-1.29.11Zm2.38-37.24c1.34-.31 2.56-.52 3.71-.69-1.03.19-2.04.41-3.04.65-.14-.07-.34-.02-.45.11-.07.02-.15.04-.22.05v-.13.01Zm.04.84c.07-.02.14-.03.2-.05.34 1.66.41 3.41.5 5.09.17 2.9.24 5.81.28 8.71l.03 3.17c-.17.07-.34.14-.51.2-.06-4.96-.21-10.58-.51-17.12h.01Zm16.04 5.62c-1.16 2.25-3.06 4.1-5.02 5.66-2.8 2.23-5.99 3.97-9.3 5.35-.01-3.56-.09-7.12-.27-10.67-.1-2.04-.16-4.16-.57-6.18 3.3-.78 6.72-1.36 10.1-1.1 1.85.14 4.23.59 5.32 2.29.92 1.43.46 3.24-.26 4.65Zm.85-.18c.6-1.37.9-2.92.28-4.32-.67-1.52-2.2-2.32-3.76-2.74.46.1.89.21 1.29.37 1.74.67 2.69 1.88 2.93 3.21.2 1.13-.05 2.25-.74 3.47V70Zm-27.47-4.14c-.12-.19-.23-.38-.34-.57.74.42.85.36.99.41v.08c-.22.03-.43.06-.65.08Zm11.21 30.46c-.08 1.08-.16 2.17-.33 3.24-.05.35-.11.69-.2 1.03 0 .04-.02.07-.03.11-.15.02-.3.04-.45.05.45-1.64.76-3.36.79-5.07.03-.29.08-.57.1-.89-.03-.31-.03-.47.24-.57-.04.69-.07 1.39-.12 2.08v.02Zm5.6-2.47c.48.11.92.52 2.49 1.72-.46-.32-.92-.65-1.38-.97-.37-.25-.73-.5-1.1-.75h-.01Zm21.23 7.24a70.76 70.76 0 0 1-4.37 4.63c-.14-.09-.27-.19-.4-.28.19-.09.37-.24.55-.47.87-1.14 5.43-5.51 5.49-7.45.31.26.62.53.92.79-.67.97-1.42 1.88-2.19 2.77v.01Z"
      fill="currentColor"
      transform="translate(-144.023 -51.76)"
    />
  </svg>
);

type LogoSize = "xs" | "small" | "normal" | "large" | "custom";

interface LogoProps {
  size?: LogoSize;
  withText?: boolean;
  style?: React.CSSProperties;
  /**
   * If true, the logo will not be wrapped in a Link component.
   * The link prop will be ignored as well.
   * It will merely be a plain div.
   */
  isNotLink?: boolean;
}

export const ExcalidrawLogo = ({
  style,
  size = "small",
  withText,
}: LogoProps) => {
  return (
    <div className={`ExcalidrawLogo is-${size}`} style={style}>
      <LogoIcon />
      {withText && <LogoText />}
    </div>
  );
};
